0c01500c0bb04000000000000000000000000000	You are in the FULL REPORT MENU preparing to generate a report on your
RADIO CONTACT LOGBOOK records with output to the monitor screen, printer, or
disk file.
The menu choices are:

PRINT THE REPORT           okay, I have made all my range selections and
                           parameters, now generate the report.

CHECK PAPER ALIGNMENT      to prepare your printer for a report.

SELECT ALTERNATE KEY       when a report is generated, the record numbers
                           are kept in sequential order.  You can specify
                           another key to sort on.  For example, if you
                           select CALL SIGN as your alternate key then
                           QSO CALL SIGNS will be in alphabetical order.

RANGE SELECTIONS           to customize your report you may specify what is
                           to be included in the report.  If you only want
                           dates of qso's from 1/5/88 to 1/7/88 (for
                           example in a contest) it is very
                           easy to accomplish by RANGE SELECTIONS.

0f0150090bb04000000000000000000000000000   PAPER ALIGNMENT.....Answer yes to test your paper alignment on your printer
or screen alignment of your report.

   REPORT KEY SELECTION.....choose a field to sort on.  If you pick CALL
SIGN then all records reported on will be in alphabetical order by call
sign.
0c01500c01104000000000000000000000000000
0d0150080bb04000000000000000000000000000OUTPUT MENU   Select where you want the report sent to; screen monitor,
				  printer, or a disk file.

RANGES MENU	  Select the range key field.  For example, if you want to
              generate a report on all the contacts with K7IIU specify here.
0f0150040b304000000000000000000000000000Enter the filename of the report.

0c01500c01104000000000000000000000000000
0c01500c01104000000000000000000000000000
0c01500c01104000000000000000000000000000
0c01500c01104000000000000000000000000000
0c01500c01104000000000000000000000000000
0c01500c01104000000000000000000000000000
0c01500c01104000000000000000000000000000
0c01500c01104000000000000000000000000000
0c01500c01104000000000000000000000000000
0c01500c01104000000000000000000000000000
0c01500c01104000000000000000000000000000
0c01500c01104000000000000000000000000000
0c01500c01104000000000000000000000000000
0c01500c01104000000000000000000000000000
0c01500c01104000000000000000000000000000
0c01500c01104000000000000000000000000000
0c01500c01104000000000000000000000000000
0c01500c01104000000000000000000000000000
0c01500c01104000000000000000000000000000
0c01500c01104000000000000000000000000000
020150080bb04000000000000000000000000000   Type in the start minimum value of the range you want.  If you chose
DATE as your range key enter the date in the form YYMMDD not MM/DD/YY!!  For
example, January 5, 1989 is entered as FROM: 890105.  If you chose CALL SIGN
as your range key and you want all contacts with KR7D enter FROM: KR7D
To: KR7D.  The ranges are case-sensitive so put capitol letters where they
are supposed to be.
020150060bb04000000000000000000000000000   Type in the maximum value of your range for your report.  If your key is
DATE enter the date in the form YYMMDD not MM/DD/YY!!  For example, January
5, 1989 is entered as TO: 890105.  The ranges are case sensitive so put
capitol letters where they are supposed to be.
030150070b304000000000000000000000000000   Enter the range of your key field.  For example if you chose CALL SIGN as
the key field and you want a report showing all the contacts you made with
K7IIU enter <from:  K7IIU    to:  K7IIU >.  NOTE:  THE RANGES ARE CASE
SENSITIVE WHICH MEANS ENTERING K7iiu will give a different report than
K7IIU.
0201500504804000000000000000000000000000	Enter the range that you want.
1101500403304000000000000000000000000000Enter the time in 24 hour military format.

1101500403304000000000000000000000000000Enter in the time in 24 hour military format.

1001500403304000000000000000000000000000Enter the frequency in megahertz.

1101500403304000000000000000000000000000Enter the frequency in megahertz.

